/* ----------------- Readme first text ---------------------------- */
HelpReadme:
        Welcome to the Orchid software installation on-line help text:
        --------------------------------------------------------------
        Press ESC  to get back to the main menu
        Press P  to print this text
        Press Page DOWN or PAGE UP to move around

  This installation program will copy the MPEG files to your hard drive 
  and set all statements required for use with Microsoft Windows 3.x and 
  DOS MPEG games.

  1. From the main menu, choose the Microsoft Windows MPEG Driver Setup & 
     Installation option.

  2. Proceed through the installation program as prompted by the installer.

  3. You will be prompted to insert the Kelvin Driver Diskette. This 
     process will copy all the graphics drivers to your hard drive.

  4. Once you return to the main menu, you can make another selection or 
     quit the installation program by pressing ESC.

  5. The Kelvin MPEG software is now installed. Reboot your system.

  6. Once you enter Windows, you will see the Kelvin MPEG Setup group. 
     Click on the Kelvin MPEG Setup icon. This program will provide four 
     options: Display Setup, Monitor Setup, Power Management and MPEG Video.

  7. Click on MPEG Video to enable the Kelvin MPEG card. Remember to change 
     the IRQs, DMAs or I/O address if you have an address conflict.

  8. Click on Monitor Setup and verify the frequency choices are supported 
     by your monitor. 

  9. Click on Display Setup and select the resolution of your choice and 
     one your monitor supports!

  10. You system will reboot with the selections you have made.

  
EndReadme:

/* ----------------- Kelvin Intro text/modes ------------------------ */

HelpWin64:
  
  Orchid Windows 3.1 Driver and File Installation for the Kelvin MPEG

  The Kelvin MPEG Installer offers standard and network server 
  installation.  If you are using Novell or a compatible network and 
  wish to load the Orchid drivers to the network server for nodes or 
  work stations to use, select this option. Once installed on the 
  network server, the Orchid icon will appear on the nodes or work 
  stations under the Control Panel.
  
  NOTE: You will not need to install the drivers on the nodes or work
        stations after installing on the server.

  Table A below lists the resolutions modes and colors depths available 
  for Kelvin MPEG when MPEG is disabled. 
 
  Table B lists the resolutions modes and colors depths available for 
  Kelvin MPEG when MPEG is enabled.
  
  Table A
  Resolutions   Color           Memory   Refresh Rates
  --------------------------------------------------------------------
   640 x 480    16 colors       1MB      60Hz & 75Hz
   640 x 480    256 colors      1MB      60Hz & 75Hz
   640 x 480    65,536 colors   1MB      60Hz & 75Hz
   640 x 480    16.7M colors    1MB      60Hz & 75Hz *
   640 x 480    16.7M colors    2MB      60Hz & 75Hz *
   800 x 600    16 colors       1MB      56Hz, 60Hz, 72Hz & 75Hz
   800 x 600    256 colors      1MB      56Hz, 60Hz, 72Hz & 75Hz
   800 x 600    65,536 colors   1MB      56Hz, 60Hz, 72Hz & 75Hz
   800 x 600    16.7M colors    2MB      56Hz, 60Hz
  1024 x 768    16 colors       1MB      43.5(i)Hz, 60Hz, 70Hz & 75Hz
  1024 x 768    256 colors      1MB      43.5(i)Hz, 60Hz, 70Hz & 75Hz
  1024 x 768    65,536 colors   2MB      43.5(i)Hz, 60Hz, 70Hz & 75Hz
  1280 x 1024   16 colors       1MB      43.5(i)Hz
  1280 x 1024   256 colors      2MB      43.5(i)Hz, 60Hz & 71Hz

  Table B
  Resolutions   Color           Memory   Refresh Rates
  --------------------------------------------------------------------
   640 x 480    16 colors       1MB      60Hz & 75Hz
   640 x 480    256 colors      1MB      60Hz & 75Hz
   640 x 480    65,536 colors   1MB      60Hz & 75Hz
   800 x 600    16 colors       1MB      56Hz, 60Hz, 72Hz & 75Hz
   800 x 600    256 colors      1MB      56Hz, 60Hz, 72Hz & 75Hz
   800 x 600    65,536 colors   1MB      56Hz, 60Hz
  1024 x 768    16 colors       1MB      43.5(i)Hz, 60Hz, 70Hz & 75Hz
  1024 x 768    256 colors      1MB      43.5(i)Hz, 60Hz, 70Hz & 75Hz

  NOTES:
  ------
  (i) interlaced mode.
  * There is a 1MB and 2MB driver for this resolution.


EndWin64:

/* ----------------- Technical Support text -------------------------- */

HelpTchsupt:


   New Kelvin drivers and additional drivers not included with this
   disk are available through the Orchid Technical Support department or
   may be downloaded from Orchid's BBS. You may also send your driver
   questions and requests to the numbers listed below.

           Technical Support Department       (510) 661-3000
           Technical Support Department Fax   (510) 651-6982
           Orchid's BBS, 14400 baud, N, 8, 1  (510) 651-6837
   
   In Europe Contact:

        France Technical Support              33 14 780-7050
        France Technical Support FAX          33 14 782-5179
        France Technical Support BBS          33 14 784-7057
        United Kingdom Technical Support      44 256 844899
        United Kingdom Technical Support FAX  44 256 64222
        United Kingdom Technical Support BBS  44 256 63373

   Compuserve users type: GO ORCHID
   
   Orchid currently provides a 16-line BBS system with eleven 14400 baud
   modems and five 9600 baud modems.  All lines are accessed through one
   phone number.  The 9600 baud units are last in the call group.  They
   will only be used after the eleven 14400 baud units are busy.  Orchid's
   modem settings are: Parity=NONE (N), Data Bits=8, and Stop Bits=1.
   NOTE: YMODEM and ZMODEM are the recommended file transfer protocols.
   
   Technical Support hours at the main office in Fremont California are:
   
      -  Monday to Friday 7:00 A.M. to 5:00 P.M. PST

EndTchsupt:

